INSERT INTO p_sensor_monitor_point(
id, 
code, 
name, 
projectid, 
picture, 
sourcesys, 
typeid, 
room, 
deviceid,
upper, 
floor, 
state, 
stat_type, 
is_displayed
) 
VALUES (
:sensorpoint.id,
:sensorpoint.code,
:sensorpoint.name,
:sensorpoint.projectid,
:sensorpoint.picture,
:sensorpoint.sourcesys,
:sensorpoint.typeid,
:sensorpoint.room,
:sensorpoint.deviceid,
:sensorpoint.upper,
:sensorpoint.floor,
:sensorpoint.state,
:sensorpoint.statType,
:sensorpoint.isDisplayed
);